From fc552950d30d752f856a7c686c4cbc74e4b0da4b Mon Sep 17 00:00:00 2001
From: alecpl <alec@alec.pl>
Date: Tue, 14 Sep 2010 06:28:43 +0000
Subject: - Added warning about tables engine, per discussion in #1486794

---
 SQL/mysql.update.sql | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

(limited to 'SQL/mysql.update.sql')

diff --git a/SQL/mysql.update.sql b/SQL/mysql.update.sql
index 23fcad838..739a3d801 100644
--- a/SQL/mysql.update.sql
+++ b/SQL/mysql.update.sql
@@ -53,7 +53,6 @@ ALTER TABLE `users` ENGINE=InnoDB;
 ALTER TABLE `contacts` ENGINE=InnoDB;
 ALTER TABLE `identities` ENGINE=InnoDB;
 
-
 -- Updates from version 0.3-stable
 
 TRUNCATE `messages`;
@@ -68,6 +67,8 @@ ALTER TABLE `contacts`
     ADD INDEX `user_contacts_index` (`user_id`,`email`);
 
 -- Updates from version 0.3.1
+-- WARNING: Make sure that all tables are using InnoDB engine!!!
+--          If not, use: ALTER TABLE xxx ENGINE=InnoDB;
 
 /* MySQL bug workaround: http://bugs.mysql.com/bug.php?id=46293 */
 /*!40014 SET FOREIGN_KEY_CHECKS=0 */;
-- 
cgit v1.2.3

