From 83121ece3348bfe09bb1026eace79a74a5ccf2c9 Mon Sep 17 00:00:00 2001
From: Aleksander Machniak <alec@alec.pl>
Date: Mon, 6 Aug 2012 10:32:37 +0200
Subject: - Removed redundant cache.cache_id column (#1488528)

---
 SQL/mysql.update.sql | 4 ++++
 1 file changed, 4 insertions(+)

(limited to 'SQL/mysql.update.sql')

diff --git a/SQL/mysql.update.sql b/SQL/mysql.update.sql
index 300ceb59d..3be65897d 100644
--- a/SQL/mysql.update.sql
+++ b/SQL/mysql.update.sql
@@ -239,3 +239,7 @@ ALTER TABLE `identities` ALTER `user_id` DROP DEFAULT;
 ALTER TABLE `searches` ALTER `user_id` DROP DEFAULT;
 
 /*!40014 SET FOREIGN_KEY_CHECKS=1 */;
+
+-- Updates from version 0.8
+
+ALTER TABLE cache DROP COLUMN cache_id;
-- 
cgit v1.2.3

