From 3d4a482fd7527cfd8ee9b86df239b7a833535cd4 Mon Sep 17 00:00:00 2001
From: alecpl <alec@alec.pl>
Date: Thu, 12 Jan 2012 07:16:51 +0000
Subject: - Fix failure on MySQL database upgrade from 0.7 - text column can't
 have default value (#1488300)

---
 SQL/mysql.initial.sql | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'SQL/mysql.initial.sql')

diff --git a/SQL/mysql.initial.sql b/SQL/mysql.initial.sql
index f66bb1eee..b0a7ee7a9 100644
--- a/SQL/mysql.initial.sql
+++ b/SQL/mysql.initial.sql
@@ -101,7 +101,7 @@ CREATE TABLE `contacts` (
  `changed` datetime NOT NULL DEFAULT '1000-01-01 00:00:00',
  `del` tinyint(1) NOT NULL DEFAULT '0',
  `name` varchar(128) NOT NULL DEFAULT '',
- `email` text NOT NULL DEFAULT '',
+ `email` text NOT NULL,
  `firstname` varchar(128) NOT NULL DEFAULT '',
  `surname` varchar(128) NOT NULL DEFAULT '',
  `vcard` longtext NULL,
-- 
cgit v1.2.3

