From 45cdac973d35de083875ed966ac687b805d60e7f Mon Sep 17 00:00:00 2001
From: Bharat Mediratta <bharat@menalto.com>
Date: Fri, 29 Jan 2010 14:06:36 -0800
Subject: Oops, somebody (me?) forgot to update the gallery module version
 number in gallery_installer::install() so the install.sql was out of sync.

---
 installer/install.sql | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'installer/install.sql')

diff --git a/installer/install.sql b/installer/install.sql
index 39637fb3..a5eec229 100644
--- a/installer/install.sql
+++ b/installer/install.sql
@@ -228,7 +228,7 @@ CREATE TABLE {modules} (
   UNIQUE KEY `name` (`name`)
 ) AUTO_INCREMENT=10 DEFAULT CHARSET=utf8;
 SET character_set_client = @saved_cs_client;
-INSERT INTO {modules} VALUES (1,1,'gallery',21);
+INSERT INTO {modules} VALUES (1,1,'gallery',22);
 INSERT INTO {modules} VALUES (2,1,'user',2);
 INSERT INTO {modules} VALUES (3,1,'comment',2);
 INSERT INTO {modules} VALUES (4,1,'organize',1);
-- 
cgit v1.2.3

